0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2

0.97

0.975

0.98

0.985

0.99

0.995

1

1.005

ESV-Relaxation

Relaxationsparameter Omega

Spektralradius der Iterationsmatrix